%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% Author:	Maximilian Stiefel
%% Date:	17.03.2017
%% University: 	Uppsala Universitet
%% Department: 	Institutionen för informationsteknologi 
%% Course:	UppSens
%% Project:	UppSense
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\newcommand{\mytitle}{Flexibel Fluorosence Intensity Measurement Platform}
\newcommand{\mytypeofwork}{Project Plan}
\newcommand{\mycourse}{UppSense} 
\newcommand{\myuniversity}{Uppsala University}
\newcommand{\mydepartement}{Information Technology}
\newcommand{\myauthora}{Elmar van Rijnswou (Elmar.Vanrijnswou.9818@student.uu.se)}
\newcommand{\myauthorb}{Maximilian Stiefel (Maximilian.Stiefel.8233@student.uu.se)}
\newcommand{\myauthorc}{}
\newcommand{\myduedate}{2017-17-10 13:00}
\newcommand{\mytutor}{Gemma Mestres (gemma.mestres@angstrom.uu.se)}
\newcommand{\mykeywords}{}
\newcommand{\myperiod}{September 2016 - September 2017}
\newcommand{\myrev}{0.2}
