\hypertarget{structos_semaphore_handle__t}{}\section{os\+Semaphore\+Handle\+\_\+t Struct Reference}
\label{structos_semaphore_handle__t}\index{os\+Semaphore\+Handle\+\_\+t@{os\+Semaphore\+Handle\+\_\+t}}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structos_semaphore_handle__t_a5a84f06656d71ab4080d24ca01c6507f}\label{structos_semaphore_handle__t_a5a84f06656d71ab4080d24ca01c6507f}} 
os\+Semaphore\+Type\+\_\+t {\bfseries type}
\item 
\mbox{\Hypertarget{structos_semaphore_handle__t_a325819a8e492ac69542e8b31705af6e9}\label{structos_semaphore_handle__t_a325819a8e492ac69542e8b31705af6e9}} 
uint8\+\_\+t {\bfseries data}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
os/\hyperlink{ostypes_8h}{ostypes.\+h}\end{DoxyCompactItemize}
